0 0.5 1 0 200 400

μ

Nt1

(i)

0 0.5 1 0 200 400

μ

Nt2

(ii)

0 200 400 0 200 400

P_t^1

(iii)

0 0.5 1 0 0.5 1 1.5

μ h

(iv)

0 0.5 1 0 200 400

μ 0 0.5 1 0 200 400

μ 0 0.5 1 0 0.5 1 1.5

μ h

0 0.5 1 0 0.5 1 1.5

μ h

0 0.5 1 0 0.5 1 1.5

μ h

0 200 400 0 200 400

P_t^1

0 0.5 1 0

500

μ 0 0.5 1 0

500

μ 0 500 0 500 1000

P_t^1

0 0.5 1 0 500 1000

μ 0 0.5 1 0 500 1000

μ 0 500 0 500 1000

P_t^1

(a)

(b)

(c)

(d)